/* @vitest-environment jsdom */

import { render, screen } from '@testing-library/react';
import userEvent from '@testing-library/user-event';
import { describe, expect, it, vi } from 'vitest';

import { BarkBattleResultPanel } from '../BarkBattleResultPanel';

describe('BarkBattleResultPanel', () => {
  it('展示胜负、叫声次数并支持再来一局', async () => {
    const onRestart = vi.fn();
    render(
      <BarkBattleResultPanel
        result={{ winner: 'player', playerBarkCount: 6, opponentBarkCount: 2, finalEnergy: 72, score: 792 }}
        onRestart={onRestart}
      />,
    );

    expect(screen.getByRole('dialog', { name: '对战结算' })).toBeTruthy();
    expect(screen.getByText('汪力压制成功')).toBeTruthy();
    expect(screen.getByText('6')).toBeTruthy();

    await userEvent.click(screen.getByRole('button', { name: '再来一局' }));
    expect(onRestart).toHaveBeenCalledTimes(1);
  });
});
